From 11d45f70ceb41f7dfbf0ae337ebd0ed7a3a63090 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Karel=20Ko=C4=8D=C3=AD?= <cynerd@email.cz>
Date: Wed, 19 Aug 2015 10:14:53 +0200
Subject: Store boot output to database

Because configuration is now stored in database only missing
informations to make database fully descriptive is boot output. This
makes output of boot command to be saved to database and not to file.

Also parse script should read input from stdin and not from file from
argument.
---
 scripts/databaseinit.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'scripts/databaseinit.sql')

diff --git a/scripts/databaseinit.sql b/scripts/databaseinit.sql
index d1ab3e2..0ca9b5a 100644
--- a/scripts/databaseinit.sql
+++ b/scripts/databaseinit.sql
@@ -28,7 +28,7 @@ CREATE TABLE measure (
 	id BIGSERIAL PRIMARY KEY, -- Id
 	conf BIGINT REFERENCES configurations (id), -- Reference to configuration
 	measurement TEXT NOT NULL, -- Text identifivator of measuring tool
-	mfile TEXT NOT NULL, -- File with measuring output
+	output TEXT NOT NULL, -- Output of boot
 	value DOUBLE PRECISION DEFAULT null, -- Measured data value
 	mtime timestamp NOT NULL, -- Time and date of measurement
 	linuxgit BIGINT REFERENCES linuxgit (id), -- Reference to git version of Linux
-- 
cgit v1.2.3

